\hypertarget{structXrlAtomList_1_1InvalidIndex}{
\section{XrlAtomList::InvalidIndex Struct Reference}
\label{structXrlAtomList_1_1InvalidIndex}\index{XrlAtomList::InvalidIndex@{XrlAtomList::InvalidIndex}}
}
Inheritance diagram for XrlAtomList::InvalidIndex:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=3.000000cm]{structXrlAtomList_1_1InvalidIndex}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structXrlAtomList_1_1InvalidIndex_a67870ce4e20294ebfea0ec239bab55b5}{
{\bfseries InvalidIndex} (const char $\ast$file, size\_\-t line, const string \&init\_\-why)}
\label{structXrlAtomList_1_1InvalidIndex_a67870ce4e20294ebfea0ec239bab55b5}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/libxipc/xrl\_\-atom\_\-list.hh\end{DoxyCompactItemize}
