\hypertarget{structWinRtmPipePlumber}{
\section{WinRtmPipePlumber Struct Reference}
\label{structWinRtmPipePlumber}\index{WinRtmPipePlumber@{WinRtmPipePlumber}}
}
\subsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structWinRtmPipePlumber_a12353351d663ed3db884644ec2ced3c8}{
typedef WinRtmPipe::ObserverList {\bfseries ObserverList}}
\label{structWinRtmPipePlumber_a12353351d663ed3db884644ec2ced3c8}

\end{DoxyCompactItemize}
\subsection*{Static Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structWinRtmPipePlumber_ad09843c08c801baf71f70428a6d97c98}{
static void {\bfseries plumb} (\hyperlink{classWinRtmPipe}{WinRtmPipe} \&r, \hyperlink{classWinRtmPipeObserver}{WinRtmPipeObserver} $\ast$o)}
\label{structWinRtmPipePlumber_ad09843c08c801baf71f70428a6d97c98}

\item 
\hypertarget{structWinRtmPipePlumber_a7d420bfc1036311771e28c058fadc6fa}{
static void {\bfseries unplumb} (\hyperlink{classWinRtmPipe}{WinRtmPipe} \&r, \hyperlink{classWinRtmPipeObserver}{WinRtmPipeObserver} $\ast$o)}
\label{structWinRtmPipePlumber_a7d420bfc1036311771e28c058fadc6fa}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/fea/data\_\-plane/control\_\-socket/windows\_\-rtm\_\-pipe.cc\end{DoxyCompactItemize}
