\hypertarget{structViUndo}{
\section{ViUndo Struct Reference}
\label{structViUndo}\index{ViUndo@{ViUndo}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structViUndo_aeb3c30a3412911c3e8b5c301d84d6e9b}{
char $\ast$ {\bfseries line}}
\label{structViUndo_aeb3c30a3412911c3e8b5c301d84d6e9b}

\item 
\hypertarget{structViUndo_ae7f96df3fd0ad7f7233c54df136fcd29}{
int {\bfseries buff\_\-curpos}}
\label{structViUndo_ae7f96df3fd0ad7f7233c54df136fcd29}

\item 
\hypertarget{structViUndo_a37fe4ae25bcfe6db513aa1b6deae27fc}{
int {\bfseries ntotal}}
\label{structViUndo_a37fe4ae25bcfe6db513aa1b6deae27fc}

\item 
\hypertarget{structViUndo_a8c759336320380d47b605ee1484a6ad1}{
int {\bfseries saved}}
\label{structViUndo_a8c759336320380d47b605ee1484a6ad1}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/getline.c\end{DoxyCompactItemize}
