\hypertarget{structIO_1_1interface__vif}{
\section{IO$<$ A $>$::interface\_\-vif Struct Reference}
\label{structIO_1_1interface__vif}\index{IO::interface\_\-vif@{IO::interface\_\-vif}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structIO_1_1interface__vif_a19fe5172d674f4bf3e4e7cca6d3fe1c9}{
string {\bfseries \_\-interface\_\-name}}
\label{structIO_1_1interface__vif_a19fe5172d674f4bf3e4e7cca6d3fe1c9}

\item 
\hypertarget{structIO_1_1interface__vif_addf02697b0b5aeb9cb0394a12cdd48a6}{
string {\bfseries \_\-vif\_\-name}}
\label{structIO_1_1interface__vif_addf02697b0b5aeb9cb0394a12cdd48a6}

\end{DoxyCompactItemize}
\subsubsection*{template$<$typename A$>$ struct IO$<$ A $>$::interface\_\-vif}



The documentation for this struct was generated from the following files:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/contrib/olsr/io.hh\item 
/home/greearb/git/xorp.ct.github/xorp/ospf/io.hh\end{DoxyCompactItemize}
