\hypertarget{structGlTerminalSize}{
\section{GlTerminalSize Struct Reference}
\label{structGlTerminalSize}\index{GlTerminalSize@{GlTerminalSize}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structGlTerminalSize_a8d62419a89515916f7b33c0e7fb5fa52}{
int {\bfseries nline}}
\label{structGlTerminalSize_a8d62419a89515916f7b33c0e7fb5fa52}

\item 
\hypertarget{structGlTerminalSize_ae391cf4d320bf617ad239cbe28850861}{
int {\bfseries ncolumn}}
\label{structGlTerminalSize_ae391cf4d320bf617ad239cbe28850861}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/libtecla.h\end{DoxyCompactItemize}
