\hypertarget{structGlSignalNode}{
\section{GlSignalNode Struct Reference}
\label{structGlSignalNode}\index{GlSignalNode@{GlSignalNode}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structGlSignalNode_a3fed918a7d5750bf6fef923b1cbecfd7}{
\hyperlink{structGlSignalNode}{GlSignalNode} $\ast$ {\bfseries next}}
\label{structGlSignalNode_a3fed918a7d5750bf6fef923b1cbecfd7}

\item 
\hypertarget{structGlSignalNode_a1a8149a57a01153b8695161b7e810748}{
int {\bfseries signo}}
\label{structGlSignalNode_a1a8149a57a01153b8695161b7e810748}

\item 
\hypertarget{structGlSignalNode_a0420f5a8111938f7034e94176611d00e}{
sigset\_\-t {\bfseries proc\_\-mask}}
\label{structGlSignalNode_a0420f5a8111938f7034e94176611d00e}

\item 
\hypertarget{structGlSignalNode_aff361ff85e6285765b9b3ba2fc79dd0d}{
SigAction {\bfseries original}}
\label{structGlSignalNode_aff361ff85e6285765b9b3ba2fc79dd0d}

\item 
\hypertarget{structGlSignalNode_a5c505d17c2c8aedbe590f736fa6b7695}{
unsigned {\bfseries flags}}
\label{structGlSignalNode_a5c505d17c2c8aedbe590f736fa6b7695}

\item 
\hypertarget{structGlSignalNode_a805e47db26a214ea14813d1009bb9fb8}{
GlAfterSignal {\bfseries after}}
\label{structGlSignalNode_a805e47db26a214ea14813d1009bb9fb8}

\item 
\hypertarget{structGlSignalNode_a7344d297ffc2cd12188489da932cc195}{
int {\bfseries errno\_\-value}}
\label{structGlSignalNode_a7344d297ffc2cd12188489da932cc195}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/getline.c\end{DoxyCompactItemize}
