\hypertarget{structGlLineList}{
\section{GlLineList Struct Reference}
\label{structGlLineList}\index{GlLineList@{GlLineList}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structGlLineList_ae3ed384b2fe6ac996e9331453e746dec}{
\hyperlink{structFreeList}{FreeList} $\ast$ {\bfseries node\_\-mem}}
\label{structGlLineList_ae3ed384b2fe6ac996e9331453e746dec}

\item 
\hypertarget{structGlLineList_a3a0a5776c6e55201c203d101bd6a48e0}{
\hyperlink{structGlLineNode}{GlLineNode} $\ast$ {\bfseries head}}
\label{structGlLineList_a3a0a5776c6e55201c203d101bd6a48e0}

\item 
\hypertarget{structGlLineList_aad6d529585cd0da43d9317fcc57042b7}{
\hyperlink{structGlLineNode}{GlLineNode} $\ast$ {\bfseries tail}}
\label{structGlLineList_aad6d529585cd0da43d9317fcc57042b7}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/history.c\end{DoxyCompactItemize}
