\hypertarget{structGlHistorySize}{
\section{GlHistorySize Struct Reference}
\label{structGlHistorySize}\index{GlHistorySize@{GlHistorySize}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structGlHistorySize_aaa32e4d8dfdf146ff7978557d3224d2a}{
size\_\-t {\bfseries size}}
\label{structGlHistorySize_aaa32e4d8dfdf146ff7978557d3224d2a}

\item 
\hypertarget{structGlHistorySize_ad463911f85779ea278db7f083e9a8055}{
size\_\-t {\bfseries used}}
\label{structGlHistorySize_ad463911f85779ea278db7f083e9a8055}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/libtecla.h\end{DoxyCompactItemize}
