\hypertarget{structGlDefSignal}{
\section{GlDefSignal Struct Reference}
\label{structGlDefSignal}\index{GlDefSignal@{GlDefSignal}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structGlDefSignal_a61a60f2e1e9ccde8ce4de185b83c1798}{
int {\bfseries signo}}
\label{structGlDefSignal_a61a60f2e1e9ccde8ce4de185b83c1798}

\item 
\hypertarget{structGlDefSignal_a709738257b6a61ff96d928ae377b88fa}{
unsigned {\bfseries flags}}
\label{structGlDefSignal_a709738257b6a61ff96d928ae377b88fa}

\item 
\hypertarget{structGlDefSignal_a14e72d808f31db8e90e3b38d1bb3ca05}{
GlAfterSignal {\bfseries after}}
\label{structGlDefSignal_a14e72d808f31db8e90e3b38d1bb3ca05}

\item 
\hypertarget{structGlDefSignal_a66b5d6fe21c4e5db5b2d346b62142c0e}{
int {\bfseries errno\_\-value}}
\label{structGlDefSignal_a66b5d6fe21c4e5db5b2d346b62142c0e}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/getline.c\end{DoxyCompactItemize}
