\hypertarget{structFreeListBlock}{
\section{FreeListBlock Struct Reference}
\label{structFreeListBlock}\index{FreeListBlock@{FreeListBlock}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structFreeListBlock_ab7fb2ae76f8b48acfe870eb41094f915}{
\hyperlink{structFreeListBlock}{FreeListBlock} $\ast$ {\bfseries next}}
\label{structFreeListBlock_ab7fb2ae76f8b48acfe870eb41094f915}

\item 
\hypertarget{structFreeListBlock_a317ad7e6bc38109ed1361125ba464717}{
char $\ast$ {\bfseries nodes}}
\label{structFreeListBlock_a317ad7e6bc38109ed1361125ba464717}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/freelist.c\end{DoxyCompactItemize}
