\hypertarget{structFreeList}{
\section{FreeList Struct Reference}
\label{structFreeList}\index{FreeList@{FreeList}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structFreeList_a882d47ca983f3973e5b3bed232d8300d}{
size\_\-t {\bfseries node\_\-size}}
\label{structFreeList_a882d47ca983f3973e5b3bed232d8300d}

\item 
\hypertarget{structFreeList_ac8f070ffac1c6065c57ac11273afc944}{
unsigned {\bfseries blocking\_\-factor}}
\label{structFreeList_ac8f070ffac1c6065c57ac11273afc944}

\item 
\hypertarget{structFreeList_aea9321931569c203d8758f0e7b494e6b}{
long {\bfseries nbusy}}
\label{structFreeList_aea9321931569c203d8758f0e7b494e6b}

\item 
\hypertarget{structFreeList_a443a7613045d93fe188c6d752b280f7e}{
\hyperlink{structFreeListBlock}{FreeListBlock} $\ast$ {\bfseries block}}
\label{structFreeList_a443a7613045d93fe188c6d752b280f7e}

\item 
\hypertarget{structFreeList_a1d5bcdb35905d9bb309dc7ed457a8b68}{
void $\ast$ {\bfseries free\_\-list}}
\label{structFreeList_a1d5bcdb35905d9bb309dc7ed457a8b68}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/cli/libtecla/freelist.c\end{DoxyCompactItemize}
