\hypertarget{structFibConfigTableGetSysctl_1_1FibMsg}{
\section{FibConfigTableGetSysctl::FibMsg Struct Reference}
\label{structFibConfigTableGetSysctl_1_1FibMsg}\index{FibConfigTableGetSysctl::FibMsg@{FibConfigTableGetSysctl::FibMsg}}
}


Flag values used to tell underlying FIB message parsing routines which messages \hyperlink{protocolthe-p}{the} caller is interested in.  




{\ttfamily \#include $<$fibconfig\_\-table\_\-get\_\-sysctl.hh$>$}

\subsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
enum \{ {\bfseries UPDATES} =  1 $<$$<$ 0, 
{\bfseries GETS} =  1 $<$$<$ 1, 
{\bfseries RESOLVES} =  1 $<$$<$ 2
 \}
\end{DoxyCompactItemize}


\subsection{Detailed Description}
Flag values used to tell underlying FIB message parsing routines which messages \hyperlink{protocolthe-p}{the} caller is interested in. 

The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/fea/data\_\-plane/fibconfig/fibconfig\_\-table\_\-get\_\-sysctl.hh\end{DoxyCompactItemize}
