\hypertarget{structBufferedAsyncReader_1_1Config}{
\section{BufferedAsyncReader::Config Struct Reference}
\label{structBufferedAsyncReader_1_1Config}\index{BufferedAsyncReader::Config@{BufferedAsyncReader::Config}}
}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structBufferedAsyncReader_1_1Config_a78c160a682b85bdbbff6e7ab54f1e5cc}{
uint8\_\-t $\ast$ {\bfseries head}}
\label{structBufferedAsyncReader_1_1Config_a78c160a682b85bdbbff6e7ab54f1e5cc}

\item 
\hypertarget{structBufferedAsyncReader_1_1Config_af3553d67eafe797999ac93868c5c7722}{
size\_\-t {\bfseries head\_\-bytes}}
\label{structBufferedAsyncReader_1_1Config_af3553d67eafe797999ac93868c5c7722}

\item 
\hypertarget{structBufferedAsyncReader_1_1Config_a74157cde9dbb605f50dc37d266b16567}{
size\_\-t {\bfseries trigger\_\-bytes}}
\label{structBufferedAsyncReader_1_1Config_a74157cde9dbb605f50dc37d266b16567}

\item 
\hypertarget{structBufferedAsyncReader_1_1Config_a1dd804df7657344c7c504a3b26162636}{
size\_\-t {\bfseries reserve\_\-bytes}}
\label{structBufferedAsyncReader_1_1Config_a1dd804df7657344c7c504a3b26162636}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/libxorp/buffered\_\-asyncio.hh\end{DoxyCompactItemize}
