\hypertarget{classxorp__noncopyable}{
\section{xorp\_\-noncopyable Class Reference}
\label{classxorp__noncopyable}\index{xorp\_\-noncopyable@{xorp\_\-noncopyable}}
}


Class is not supposed to be coppied, so we don't implement \hyperlink{protocolthe-p}{the} copy methods, but we do declare them.  




{\ttfamily \#include $<$xorp\_\-noncopyable.hh$>$}

\subsection*{Private Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classxorp__noncopyable_a03732a1b125f813b758ccbc8ab45a2db}{
{\bfseries xorp\_\-noncopyable} (const \hyperlink{classxorp__noncopyable}{xorp\_\-noncopyable} \&rhs)}
\label{classxorp__noncopyable_a03732a1b125f813b758ccbc8ab45a2db}

\item 
\hypertarget{classxorp__noncopyable_a4c9b952e9c1ecfa478445e5f95c6e0f0}{
\hyperlink{classxorp__noncopyable}{xorp\_\-noncopyable} \& {\bfseries operator=} (const \hyperlink{classxorp__noncopyable}{xorp\_\-noncopyable} \&rhs)}
\label{classxorp__noncopyable_a4c9b952e9c1ecfa478445e5f95c6e0f0}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
Class is not supposed to be coppied, so we don't implement \hyperlink{protocolthe-p}{the} copy methods, but we do declare them. This will cause a compile error if anyone ever tries to copy objects descended from \hyperlink{classxorp__noncopyable}{xorp\_\-noncopyable}. 

The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/libxorp/xorp\_\-noncopyable.hh\end{DoxyCompactItemize}
