\hypertarget{classmySelectorListObserver}{
\section{mySelectorListObserver Class Reference}
\label{classmySelectorListObserver}\index{mySelectorListObserver@{mySelectorListObserver}}
}
Inheritance diagram for mySelectorListObserver:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classmySelectorListObserver}
\end{center}
\end{figure}
\subsection*{Private Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classmySelectorListObserver_a46ddc021d00474658b9154fefda2a674}{
void \hyperlink{classmySelectorListObserver_a46ddc021d00474658b9154fefda2a674}{notify\_\-added} (\hyperlink{classXorpFd}{XorpFd}, const SelectorMask \&)}
\label{classmySelectorListObserver_a46ddc021d00474658b9154fefda2a674}

\begin{DoxyCompactList}\small\item\em This function will get called when a new file descriptor is added to \hyperlink{protocolthe-p}{the} \hyperlink{classSelectorList}{SelectorList}. \item\end{DoxyCompactList}\item 
\hypertarget{classmySelectorListObserver_a06d3380580eb91e2a4b01ccd195c6e45}{
void \hyperlink{classmySelectorListObserver_a06d3380580eb91e2a4b01ccd195c6e45}{notify\_\-removed} (\hyperlink{classXorpFd}{XorpFd}, const SelectorMask \&)}
\label{classmySelectorListObserver_a06d3380580eb91e2a4b01ccd195c6e45}

\begin{DoxyCompactList}\small\item\em This function will get called when a new file descriptor is removed from \hyperlink{protocolthe-p}{the} \hyperlink{classSelectorList}{SelectorList}. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/libxorp/tests/test\_\-observers.cc\end{DoxyCompactItemize}
