\hypertarget{classXrlShutdown}{
\section{XrlShutdown Class Reference}
\label{classXrlShutdown}\index{XrlShutdown@{XrlShutdown}}
}
Inheritance diagram for XrlShutdown:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classXrlShutdown}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classXrlShutdown_aad3807813e1e61801adba28169aab3fd}{
{\bfseries XrlShutdown} (const string \&module\_\-name, const \hyperlink{classXrlAction}{XrlAction} \&xrl\_\-action, \hyperlink{classTaskManager}{TaskManager} \&taskmgr)}
\label{classXrlShutdown_aad3807813e1e61801adba28169aab3fd}

\item 
\hypertarget{classXrlShutdown_af725af3d23fe2923e7500de70178b042}{
void {\bfseries shutdown} (const \hyperlink{classRunCommandBase_1_1ExecId}{RunShellCommand::ExecId} \&exec\_\-id, CallBack cb)}
\label{classXrlShutdown_af725af3d23fe2923e7500de70178b042}

\item 
\hypertarget{classXrlShutdown_a7b6beb543d0022d104d2415bd708d034}{
\hyperlink{classEventLoop}{EventLoop} \& {\bfseries eventloop} () const }
\label{classXrlShutdown_a7b6beb543d0022d104d2415bd708d034}

\end{DoxyCompactItemize}
\subsection*{Private Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classXrlShutdown_aec16c396215daf8385d3e00308008f1c}{
void {\bfseries dummy\_\-response} ()}
\label{classXrlShutdown_aec16c396215daf8385d3e00308008f1c}

\item 
\hypertarget{classXrlShutdown_a903e0904ab6a6e48c5d299c1e597af17}{
void {\bfseries shutdown\_\-done} (const \hyperlink{classXrlError}{XrlError} \&err, \hyperlink{classXrlArgs}{XrlArgs} $\ast$xrl\_\-args)}
\label{classXrlShutdown_a903e0904ab6a6e48c5d299c1e597af17}

\end{DoxyCompactItemize}
\subsection*{Private Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classXrlShutdown_a89ca9d403b1c310eba285bfa5b6ab2cf}{
const \hyperlink{classXrlAction}{XrlAction} \& {\bfseries \_\-xrl\_\-action}}
\label{classXrlShutdown_a89ca9d403b1c310eba285bfa5b6ab2cf}

\item 
\hypertarget{classXrlShutdown_aaac65e1b357bdda73df79dbb28dc8af7}{
\hyperlink{classTaskManager}{TaskManager} \& {\bfseries \_\-task\_\-manager}}
\label{classXrlShutdown_aaac65e1b357bdda73df79dbb28dc8af7}

\item 
\hypertarget{classXrlShutdown_a4f8f27b5d62e0a1fadccb3f865f23544}{
CallBack {\bfseries \_\-cb}}
\label{classXrlShutdown_a4f8f27b5d62e0a1fadccb3f865f23544}

\item 
\hypertarget{classXrlShutdown_a3f61eda83c161e7fa04617d8764f5b24}{
\hyperlink{classXorpTimer}{XorpTimer} {\bfseries \_\-dummy\_\-timer}}
\label{classXrlShutdown_a3f61eda83c161e7fa04617d8764f5b24}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following files:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/rtrmgr/task.hh\item 
/home/greearb/git/xorp.ct.github/xorp/rtrmgr/task.cc\end{DoxyCompactItemize}
