\hypertarget{classUnusableMessage}{
\section{UnusableMessage Class Reference}
\label{classUnusableMessage}\index{UnusableMessage@{UnusableMessage}}
}


This exception is thrown when an update message is received, and we find it unusable, but not so bad that we want to send a Notification and terminate \hyperlink{protocolthe-p}{the} connection.  




{\ttfamily \#include $<$exceptions.hh$>$}

Inheritance diagram for UnusableMessage:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=3.000000cm]{classUnusableMessage}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classUnusableMessage_a8384e981ff9b3c107fe0b0ec3a841894}{
{\bfseries UnusableMessage} (const char $\ast$file, size\_\-t line, const string init\_\-why)}
\label{classUnusableMessage_a8384e981ff9b3c107fe0b0ec3a841894}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
This exception is thrown when an update message is received, and we find it unusable, but not so bad that we want to send a Notification and terminate \hyperlink{protocolthe-p}{the} connection. 

The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/bgp/exceptions.hh\end{DoxyCompactItemize}
