\hypertarget{classTraceAIO}{
\section{TraceAIO Class Reference}
\label{classTraceAIO}\index{TraceAIO@{TraceAIO}}
}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classTraceAIO_add15be49232f831b5100cea030449e53}{
bool {\bfseries on} () const }
\label{classTraceAIO_add15be49232f831b5100cea030449e53}

\end{DoxyCompactItemize}
\subsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classTraceAIO_a9cab7cf1f2edbd8ad258255f4743b972}{
bool {\bfseries \_\-do\_\-trace}}
\label{classTraceAIO_a9cab7cf1f2edbd8ad258255f4743b972}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/libxorp/asyncio.cc\end{DoxyCompactItemize}
