\hypertarget{classShutdown}{
\section{Shutdown Class Reference}
\label{classShutdown}\index{Shutdown@{Shutdown}}
}
Inheritance diagram for Shutdown:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classShutdown}
\end{center}
\end{figure}
\subsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classShutdown_adb47c9df669d0268a2b5d66d6fa6643b}{
typedef XorpCallback1$<$ void, bool $>$::RefPtr {\bfseries CallBack}}
\label{classShutdown_adb47c9df669d0268a2b5d66d6fa6643b}

\end{DoxyCompactItemize}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classShutdown_a6a1bc98194773bb771f0c4fcc50e831c}{
{\bfseries Shutdown} (const string \&module\_\-name, bool verbose)}
\label{classShutdown_a6a1bc98194773bb771f0c4fcc50e831c}

\item 
\hypertarget{classShutdown_af59a40e64de14e8e2176dd518d68005f}{
virtual void {\bfseries shutdown} (const \hyperlink{classRunCommandBase_1_1ExecId}{RunShellCommand::ExecId} \&exec\_\-id, CallBack cb)=0}
\label{classShutdown_af59a40e64de14e8e2176dd518d68005f}

\end{DoxyCompactItemize}
\subsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classShutdown_a81494ac2b7caee4f280dfd4a690a80fe}{
const string {\bfseries \_\-module\_\-name}}
\label{classShutdown_a81494ac2b7caee4f280dfd4a690a80fe}

\item 
\hypertarget{classShutdown_a88756d97fae3a57358f6f8784155b41c}{
bool {\bfseries \_\-verbose}}
\label{classShutdown_a88756d97fae3a57358f6f8784155b41c}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following files:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/rtrmgr/task.hh\item 
/home/greearb/git/xorp.ct.github/xorp/rtrmgr/task.cc\end{DoxyCompactItemize}
