\hypertarget{classSafeWidget}{
\section{SafeWidget Class Reference}
\label{classSafeWidget}\index{SafeWidget@{SafeWidget}}
}
Inheritance diagram for SafeWidget:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=3.000000cm]{classSafeWidget}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classSafeWidget_a6a4cad0f7712b39c56cdf561a790ff6a}{
{\bfseries SafeWidget} (int $\ast$counter)}
\label{classSafeWidget_a6a4cad0f7712b39c56cdf561a790ff6a}

\item 
\hypertarget{classSafeWidget_a1617cd094a6728f34b79d54d8112c073}{
void {\bfseries notify} (int event)}
\label{classSafeWidget_a1617cd094a6728f34b79d54d8112c073}

\end{DoxyCompactItemize}
\subsection*{Private Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classSafeWidget_ab42ef90ba94ce1907788b46217677a74}{
int $\ast$ {\bfseries \_\-counter}}
\label{classSafeWidget_ab42ef90ba94ce1907788b46217677a74}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/libxorp/tests/test\_\-callback.cc\end{DoxyCompactItemize}
