\hypertarget{classProcessWatch_1_1Process}{
\section{ProcessWatch::Process Class Reference}
\label{classProcessWatch_1_1Process}\index{ProcessWatch::Process@{ProcessWatch::Process}}
}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classProcessWatch_1_1Process_ac1d228a81ed8af6d2694a6312dcc6f0a}{
{\bfseries Process} (string c, string i)}
\label{classProcessWatch_1_1Process_ac1d228a81ed8af6d2694a6312dcc6f0a}

\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classProcessWatch_1_1Process_a09b3ce3a4decc68366d30c8152da0190}{
string {\bfseries \_\-target\_\-class}}
\label{classProcessWatch_1_1Process_a09b3ce3a4decc68366d30c8152da0190}

\item 
\hypertarget{classProcessWatch_1_1Process_a65048244c21261585dccfc38c5fb5861}{
string {\bfseries \_\-target\_\-instance}}
\label{classProcessWatch_1_1Process_a65048244c21261585dccfc38c5fb5861}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/bgp/process\_\-watch.hh\end{DoxyCompactItemize}
