\hypertarget{classProcessWatch_1_1PWException}{
\section{ProcessWatch::PWException Class Reference}
\label{classProcessWatch_1_1PWException}\index{ProcessWatch::PWException@{ProcessWatch::PWException}}
}


Exception thrown on error, such as \hyperlink{classXrl}{Xrl} failure.  




{\ttfamily \#include $<$process\_\-watch.hh$>$}

Inheritance diagram for ProcessWatch::PWException:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=4.000000cm]{classProcessWatch_1_1PWException}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classProcessWatch_1_1PWException_a628bee2fe9f6260be319432babfe94ea}{
{\bfseries PWException} (const char $\ast$file, size\_\-t line, const string \&init\_\-why=\char`\"{}\char`\"{})}
\label{classProcessWatch_1_1PWException_a628bee2fe9f6260be319432babfe94ea}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
Exception thrown on error, such as \hyperlink{classXrl}{Xrl} failure. 

The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/policy/process\_\-watch.hh\end{DoxyCompactItemize}
