\hypertarget{classPlumbingTest}{
\section{PlumbingTest Class Reference}
\label{classPlumbingTest}\index{PlumbingTest@{PlumbingTest}}
}
Inheritance diagram for PlumbingTest:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classPlumbingTest}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classPlumbingTest_add9a29dc6198ccd41cb14c85c9c7332f}{
{\bfseries PlumbingTest} (\hyperlink{classNextHopResolver}{NextHopResolver}$<$ \hyperlink{classIPv4}{IPv4} $>$ \&nhr\_\-ipv4, \hyperlink{classNextHopResolver}{NextHopResolver}$<$ \hyperlink{classIPv6}{IPv6} $>$ \&nhr\_\-ipv6, \hyperlink{classPolicyFilters}{PolicyFilters} \&pfs, \hyperlink{classBGPMain}{BGPMain} \&bgp)}
\label{classPlumbingTest_add9a29dc6198ccd41cb14c85c9c7332f}

\item 
\hypertarget{classPlumbingTest_a6b95411ebdaee6ad02bdb2a534fa9fdd}{
bool {\bfseries run\_\-tests} (\hyperlink{classBGPMain}{BGPMain} \&bgpmain)}
\label{classPlumbingTest_a6b95411ebdaee6ad02bdb2a534fa9fdd}

\item 
\hypertarget{classPlumbingTest_ab2305c64dbc6a13012051ac61e3b17ea}{
bool {\bfseries test1} (\hyperlink{classBGPMain}{BGPMain} \&bgpmain)}
\label{classPlumbingTest_ab2305c64dbc6a13012051ac61e3b17ea}

\item 
\hypertarget{classPlumbingTest_a52c17e521ff897ff75c182ee8f54df92}{
bool {\bfseries test2} (\hyperlink{classBGPMain}{BGPMain} \&bgpmain)}
\label{classPlumbingTest_a52c17e521ff897ff75c182ee8f54df92}

\end{DoxyCompactItemize}


The documentation for this class was generated from the following files:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/bgp/tests/test\_\-plumbing.hh\item 
/home/greearb/git/xorp.ct.github/xorp/bgp/tests/test\_\-plumbing.cc\end{DoxyCompactItemize}
