\hypertarget{classFilterManagerFake}{
\section{FilterManagerFake Class Reference}
\label{classFilterManagerFake}\index{FilterManagerFake@{FilterManagerFake}}
}
Inheritance diagram for FilterManagerFake:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFilterManagerFake}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{classFilterManagerFake_a6f8a29794dbfbab82d42af030f3e3ecd}{update\_\-filter} (const \hyperlink{classCode_1_1Target}{Code::Target} \&t)
\begin{DoxyCompactList}\small\item\em Update a specific policy filter. \item\end{DoxyCompactList}\item 
void \hyperlink{classFilterManagerFake_a18d0edfe8f94ca63b771d9b4e828e45b}{flush\_\-updates} (uint32\_\-t msec)
\begin{DoxyCompactList}\small\item\em Commit all updates after msec milliseconds. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Member Function Documentation}
\hypertarget{classFilterManagerFake_a18d0edfe8f94ca63b771d9b4e828e45b}{
\index{FilterManagerFake@{FilterManagerFake}!flush\_\-updates@{flush\_\-updates}}
\index{flush\_\-updates@{flush\_\-updates}!FilterManagerFake@{FilterManagerFake}}
\subsubsection[{flush\_\-updates}]{\setlength{\rightskip}{0pt plus 5cm}void FilterManagerFake::flush\_\-updates (
\begin{DoxyParamCaption}
\item[{uint32\_\-t}]{msec}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFilterManagerFake_a18d0edfe8f94ca63b771d9b4e828e45b}


Commit all updates after msec milliseconds. 


\begin{DoxyParams}{Parameters}
{\em msec} & Milliseconds after which all updates should be commited. \\
\hline
\end{DoxyParams}


Implements \hyperlink{classFilterManagerBase_aa1197979f4c84028d93c4a8df1732f54}{FilterManagerBase}.

\hypertarget{classFilterManagerFake_a6f8a29794dbfbab82d42af030f3e3ecd}{
\index{FilterManagerFake@{FilterManagerFake}!update\_\-filter@{update\_\-filter}}
\index{update\_\-filter@{update\_\-filter}!FilterManagerFake@{FilterManagerFake}}
\subsubsection[{update\_\-filter}]{\setlength{\rightskip}{0pt plus 5cm}void FilterManagerFake::update\_\-filter (
\begin{DoxyParamCaption}
\item[{const {\bf Code::Target} \&}]{t}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFilterManagerFake_a6f8a29794dbfbab82d42af030f3e3ecd}


Update a specific policy filter. 


\begin{DoxyParams}{Parameters}
{\em t} & The target to update \mbox{[}protocol/filter pair\mbox{]}. \\
\hline
\end{DoxyParams}


Implements \hyperlink{classFilterManagerBase_ad21a35b2b4e01a454d4c6e23841ebb0e}{FilterManagerBase}.



The documentation for this class was generated from the following files:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/policy/tests/filter\_\-manager\_\-fake.hh\item 
/home/greearb/git/xorp.ct.github/xorp/policy/tests/filter\_\-manager\_\-fake.cc\end{DoxyCompactItemize}
