\hypertarget{classFibConfigTableObserverIPHelper}{
\section{FibConfigTableObserverIPHelper Class Reference}
\label{classFibConfigTableObserverIPHelper}\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
}
Inheritance diagram for FibConfigTableObserverIPHelper:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFibConfigTableObserverIPHelper}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classFibConfigTableObserverIPHelper_ac7715a9673cd3e4ca084e194e2a51837}{FibConfigTableObserverIPHelper} (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager} \&fea\_\-data\_\-plane\_\-manager)
\begin{DoxyCompactList}\small\item\em Constructor. \item\end{DoxyCompactList}\item 
\hypertarget{classFibConfigTableObserverIPHelper_a3c953b7519656c6c7f52e1bd6d656c4f}{
virtual \hyperlink{classFibConfigTableObserverIPHelper_a3c953b7519656c6c7f52e1bd6d656c4f}{$\sim$FibConfigTableObserverIPHelper} ()}
\label{classFibConfigTableObserverIPHelper_a3c953b7519656c6c7f52e1bd6d656c4f}

\begin{DoxyCompactList}\small\item\em Virtual destructor. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigTableObserverIPHelper_a9db195430b0920b7c51d47fbf799b422}{start} (string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Start operation. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigTableObserverIPHelper_a824f3958181c4095a2e4581c4ed4587a}{stop} (string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Stop operation. \item\end{DoxyCompactList}\item 
virtual void \hyperlink{classFibConfigTableObserverIPHelper_a53ab186cf2d49fa0835653f30a1a29eb}{receive\_\-data} (const vector$<$ uint8\_\-t $>$ \&buffer)
\begin{DoxyCompactList}\small\item\em Receive data from \hyperlink{protocolthe-p}{the} underlying system. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigTableObserverIPHelper_abc35dc89f7262f7520788750672d06c4}{notify\_\-table\_\-id\_\-change} (uint32\_\-t new\_\-tbl)
\begin{DoxyCompactList}\small\item\em \hyperlink{classRouting}{Routing} table ID that we are interested in might have changed. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{classFibConfigTableObserverIPHelper_ac7715a9673cd3e4ca084e194e2a51837}{
\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}!FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}!FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
\subsubsection[{FibConfigTableObserverIPHelper}]{\setlength{\rightskip}{0pt plus 5cm}FibConfigTableObserverIPHelper::FibConfigTableObserverIPHelper (
\begin{DoxyParamCaption}
\item[{{\bf FeaDataPlaneManager} \&}]{fea\_\-data\_\-plane\_\-manager}
\end{DoxyParamCaption}
)}}
\label{classFibConfigTableObserverIPHelper_ac7715a9673cd3e4ca084e194e2a51837}


Constructor. 


\begin{DoxyParams}{Parameters}
{\em fea\_\-data\_\-plane\_\-manager} & \hyperlink{protocolthe-p}{the} corresponding data plane manager (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager}). \\
\hline
\end{DoxyParams}


\subsection{Member Function Documentation}
\hypertarget{classFibConfigTableObserverIPHelper_abc35dc89f7262f7520788750672d06c4}{
\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}!notify\_\-table\_\-id\_\-change@{notify\_\-table\_\-id\_\-change}}
\index{notify\_\-table\_\-id\_\-change@{notify\_\-table\_\-id\_\-change}!FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
\subsubsection[{notify\_\-table\_\-id\_\-change}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigTableObserverIPHelper::notify\_\-table\_\-id\_\-change (
\begin{DoxyParamCaption}
\item[{uint32\_\-t}]{new\_\-tbl}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}inline, virtual\mbox{]}}}}
\label{classFibConfigTableObserverIPHelper_abc35dc89f7262f7520788750672d06c4}


\hyperlink{classRouting}{Routing} table ID that we are interested in might have changed. 

Maybe something can filter on this for increased efficiency. 

Implements \hyperlink{classFibConfigTableObserver_af83102179f01075507730262874e9d49}{FibConfigTableObserver}.

\hypertarget{classFibConfigTableObserverIPHelper_a53ab186cf2d49fa0835653f30a1a29eb}{
\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}!receive\_\-data@{receive\_\-data}}
\index{receive\_\-data@{receive\_\-data}!FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
\subsubsection[{receive\_\-data}]{\setlength{\rightskip}{0pt plus 5cm}virtual void FibConfigTableObserverIPHelper::receive\_\-data (
\begin{DoxyParamCaption}
\item[{const vector$<$ uint8\_\-t $>$ \&}]{buffer}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigTableObserverIPHelper_a53ab186cf2d49fa0835653f30a1a29eb}


Receive data from \hyperlink{protocolthe-p}{the} underlying system. 


\begin{DoxyParams}{Parameters}
{\em buffer} & \hyperlink{protocolthe-p}{the} buffer with \hyperlink{protocolthe-p}{the} received data. \\
\hline
\end{DoxyParams}


Implements \hyperlink{classFibConfigTableObserver_a6a71f22af228cad58b0758e03fe93d68}{FibConfigTableObserver}.

\hypertarget{classFibConfigTableObserverIPHelper_a9db195430b0920b7c51d47fbf799b422}{
\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}!start@{start}}
\index{start@{start}!FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
\subsubsection[{start}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigTableObserverIPHelper::start (
\begin{DoxyParamCaption}
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigTableObserverIPHelper_a9db195430b0920b7c51d47fbf799b422}


Start operation. 


\begin{DoxyParams}{Parameters}
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigTableObserver_a987476b869c7dc15ee84359a789a5268}{FibConfigTableObserver}.

\hypertarget{classFibConfigTableObserverIPHelper_a824f3958181c4095a2e4581c4ed4587a}{
\index{FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}!stop@{stop}}
\index{stop@{stop}!FibConfigTableObserverIPHelper@{FibConfigTableObserverIPHelper}}
\subsubsection[{stop}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigTableObserverIPHelper::stop (
\begin{DoxyParamCaption}
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigTableObserverIPHelper_a824f3958181c4095a2e4581c4ed4587a}


Stop operation. 


\begin{DoxyParams}{Parameters}
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigTableObserver_aa60a87b163660296369a1ab2da44b8d0}{FibConfigTableObserver}.



The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/fea/data\_\-plane/fibconfig/fibconfig\_\-table\_\-observer\_\-iphelper.hh\end{DoxyCompactItemize}
