\hypertarget{classFibConfigForwardingSysctl}{
\section{FibConfigForwardingSysctl Class Reference}
\label{classFibConfigForwardingSysctl}\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
}
Inheritance diagram for FibConfigForwardingSysctl:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFibConfigForwardingSysctl}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classFibConfigForwardingSysctl_a7b389951d2e66513b72b7d8acb175d34}{FibConfigForwardingSysctl} (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager} \&fea\_\-data\_\-plane\_\-manager)
\begin{DoxyCompactList}\small\item\em Constructor. \item\end{DoxyCompactList}\item 
\hypertarget{classFibConfigForwardingSysctl_a34b66cb118eb0ad8b25f1fe23429d3a7}{
virtual \hyperlink{classFibConfigForwardingSysctl_a34b66cb118eb0ad8b25f1fe23429d3a7}{$\sim$FibConfigForwardingSysctl} ()}
\label{classFibConfigForwardingSysctl_a34b66cb118eb0ad8b25f1fe23429d3a7}

\begin{DoxyCompactList}\small\item\em Virtual destructor. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSysctl_a05178cd06d24f784db85b810614b2fd8}{unicast\_\-forwarding\_\-enabled4} (bool \&ret\_\-value, string \&error\_\-msg) const 
\begin{DoxyCompactList}\small\item\em Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine is enabled or disabled to forward packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSysctl_a190242ccd4996d16e9c4b1accde48bfd}{unicast\_\-forwarding\_\-enabled6} (bool \&ret\_\-value, string \&error\_\-msg) const 
\begin{DoxyCompactList}\small\item\em Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine is enabled or disabled to forward packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSysctl_a58d6cab70bf10a8f45e8b920b5982237}{accept\_\-rtadv\_\-enabled6} (bool \&ret\_\-value, string \&error\_\-msg) const 
\begin{DoxyCompactList}\small\item\em Test whether \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages is enabled or disabled. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSysctl_a0b0c924ab049f1dd5ab7df305c5cf597}{set\_\-unicast\_\-forwarding\_\-enabled4} (bool v, string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine to enable or disable forwarding of packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSysctl_a1c88bc3bdcba7424941c7a01417b774f}{set\_\-unicast\_\-forwarding\_\-enabled6} (bool v, string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine to enable or disable forwarding of packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSysctl_ab1f41ccb9cf5b17116871ad504d184eb}{set\_\-accept\_\-rtadv\_\-enabled6} (bool v, string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Enable or disable \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages from other routers. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{classFibConfigForwardingSysctl_a7b389951d2e66513b72b7d8acb175d34}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{FibConfigForwardingSysctl}]{\setlength{\rightskip}{0pt plus 5cm}FibConfigForwardingSysctl::FibConfigForwardingSysctl (
\begin{DoxyParamCaption}
\item[{{\bf FeaDataPlaneManager} \&}]{fea\_\-data\_\-plane\_\-manager}
\end{DoxyParamCaption}
)}}
\label{classFibConfigForwardingSysctl_a7b389951d2e66513b72b7d8acb175d34}


Constructor. 


\begin{DoxyParams}{Parameters}
{\em fea\_\-data\_\-plane\_\-manager} & \hyperlink{protocolthe-p}{the} corresponding data plane manager (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager}). \\
\hline
\end{DoxyParams}


\subsection{Member Function Documentation}
\hypertarget{classFibConfigForwardingSysctl_a58d6cab70bf10a8f45e8b920b5982237}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!accept\_\-rtadv\_\-enabled6@{accept\_\-rtadv\_\-enabled6}}
\index{accept\_\-rtadv\_\-enabled6@{accept\_\-rtadv\_\-enabled6}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{accept\_\-rtadv\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSysctl::accept\_\-rtadv\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool \&}]{ret\_\-value, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSysctl_a58d6cab70bf10a8f45e8b920b5982237}


Test whether \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages is enabled or disabled. 


\begin{DoxyParams}{Parameters}
{\em ret\_\-value} & if true on return, then \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages is enabled, otherwise is disabled. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a32455f2ccfbd390774634652f1912d8a}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSysctl_ab1f41ccb9cf5b17116871ad504d184eb}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!set\_\-accept\_\-rtadv\_\-enabled6@{set\_\-accept\_\-rtadv\_\-enabled6}}
\index{set\_\-accept\_\-rtadv\_\-enabled6@{set\_\-accept\_\-rtadv\_\-enabled6}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{set\_\-accept\_\-rtadv\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSysctl::set\_\-accept\_\-rtadv\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool}]{v, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSysctl_ab1f41ccb9cf5b17116871ad504d184eb}


Enable or disable \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages from other routers. 

It should be enabled for hosts, and disabled for routers.


\begin{DoxyParams}{Parameters}
{\em v} & if true, then enable \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages, otherwise disable it. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_ab102d1fb425892602103301f2c73af89}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSysctl_a0b0c924ab049f1dd5ab7df305c5cf597}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!set\_\-unicast\_\-forwarding\_\-enabled4@{set\_\-unicast\_\-forwarding\_\-enabled4}}
\index{set\_\-unicast\_\-forwarding\_\-enabled4@{set\_\-unicast\_\-forwarding\_\-enabled4}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{set\_\-unicast\_\-forwarding\_\-enabled4}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSysctl::set\_\-unicast\_\-forwarding\_\-enabled4 (
\begin{DoxyParamCaption}
\item[{bool}]{v, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSysctl_a0b0c924ab049f1dd5ab7df305c5cf597}


Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine to enable or disable forwarding of packets. 


\begin{DoxyParams}{Parameters}
{\em v} & if true, then enable \hyperlink{classIPv4}{IPv4} unicast forwarding, otherwise disable it. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a981daf728abe383181bb13cbc44caa9d}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSysctl_a1c88bc3bdcba7424941c7a01417b774f}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!set\_\-unicast\_\-forwarding\_\-enabled6@{set\_\-unicast\_\-forwarding\_\-enabled6}}
\index{set\_\-unicast\_\-forwarding\_\-enabled6@{set\_\-unicast\_\-forwarding\_\-enabled6}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{set\_\-unicast\_\-forwarding\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSysctl::set\_\-unicast\_\-forwarding\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool}]{v, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSysctl_a1c88bc3bdcba7424941c7a01417b774f}


Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine to enable or disable forwarding of packets. 


\begin{DoxyParams}{Parameters}
{\em v} & if true, then enable \hyperlink{classIPv6}{IPv6} unicast forwarding, otherwise disable it. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a2f30de6b81329ceb56a06bb9ab21f4b7}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSysctl_a05178cd06d24f784db85b810614b2fd8}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!unicast\_\-forwarding\_\-enabled4@{unicast\_\-forwarding\_\-enabled4}}
\index{unicast\_\-forwarding\_\-enabled4@{unicast\_\-forwarding\_\-enabled4}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{unicast\_\-forwarding\_\-enabled4}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSysctl::unicast\_\-forwarding\_\-enabled4 (
\begin{DoxyParamCaption}
\item[{bool \&}]{ret\_\-value, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSysctl_a05178cd06d24f784db85b810614b2fd8}


Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine is enabled or disabled to forward packets. 


\begin{DoxyParams}{Parameters}
{\em ret\_\-value} & if true on return, then \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding is enabled, otherwise is disabled. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a75444169a6dd97809cfcbca73fc81957}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSysctl_a190242ccd4996d16e9c4b1accde48bfd}{
\index{FibConfigForwardingSysctl@{FibConfigForwardingSysctl}!unicast\_\-forwarding\_\-enabled6@{unicast\_\-forwarding\_\-enabled6}}
\index{unicast\_\-forwarding\_\-enabled6@{unicast\_\-forwarding\_\-enabled6}!FibConfigForwardingSysctl@{FibConfigForwardingSysctl}}
\subsubsection[{unicast\_\-forwarding\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSysctl::unicast\_\-forwarding\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool \&}]{ret\_\-value, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSysctl_a190242ccd4996d16e9c4b1accde48bfd}


Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine is enabled or disabled to forward packets. 


\begin{DoxyParams}{Parameters}
{\em ret\_\-value} & if true on return, then \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding is enabled, otherwise is disabled. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a10143fca75849e816de4328e898176b1}{FibConfigForwarding}.



The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/fea/data\_\-plane/fibconfig/fibconfig\_\-forwarding\_\-sysctl.hh\end{DoxyCompactItemize}
