\hypertarget{classFibConfigForwardingSolaris}{
\section{FibConfigForwardingSolaris Class Reference}
\label{classFibConfigForwardingSolaris}\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
}
Inheritance diagram for FibConfigForwardingSolaris:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFibConfigForwardingSolaris}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classFibConfigForwardingSolaris_ad20e3c546f354b082f79688bc5121721}{FibConfigForwardingSolaris} (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager} \&fea\_\-data\_\-plane\_\-manager)
\begin{DoxyCompactList}\small\item\em Constructor. \item\end{DoxyCompactList}\item 
\hypertarget{classFibConfigForwardingSolaris_a0943cfeb414010c3cc02eacc4f427e2a}{
virtual \hyperlink{classFibConfigForwardingSolaris_a0943cfeb414010c3cc02eacc4f427e2a}{$\sim$FibConfigForwardingSolaris} ()}
\label{classFibConfigForwardingSolaris_a0943cfeb414010c3cc02eacc4f427e2a}

\begin{DoxyCompactList}\small\item\em Virtual destructor. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSolaris_a027a1a0797a1ebcbee4f44ae227a2f60}{unicast\_\-forwarding\_\-enabled4} (bool \&ret\_\-value, string \&error\_\-msg) const 
\begin{DoxyCompactList}\small\item\em Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine is enabled or disabled to forward packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSolaris_aa72215b832bbb92aa413eda18353aeee}{unicast\_\-forwarding\_\-enabled6} (bool \&ret\_\-value, string \&error\_\-msg) const 
\begin{DoxyCompactList}\small\item\em Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine is enabled or disabled to forward packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSolaris_a1443aad6a880e77d2df38b87b48b6f41}{accept\_\-rtadv\_\-enabled6} (bool \&ret\_\-value, string \&error\_\-msg) const 
\begin{DoxyCompactList}\small\item\em Test whether \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages is enabled or disabled. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSolaris_a1ac28f83f798fb2721bc2ef2b716c0d5}{set\_\-unicast\_\-forwarding\_\-enabled4} (bool v, string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine to enable or disable forwarding of packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSolaris_a0d062c1998b21820dd98696980ad2918}{set\_\-unicast\_\-forwarding\_\-enabled6} (bool v, string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine to enable or disable forwarding of packets. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigForwardingSolaris_af501746336ec4eaf452a8c6d83c8f852}{set\_\-accept\_\-rtadv\_\-enabled6} (bool v, string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Enable or disable \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages from other routers. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{classFibConfigForwardingSolaris_ad20e3c546f354b082f79688bc5121721}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{FibConfigForwardingSolaris}]{\setlength{\rightskip}{0pt plus 5cm}FibConfigForwardingSolaris::FibConfigForwardingSolaris (
\begin{DoxyParamCaption}
\item[{{\bf FeaDataPlaneManager} \&}]{fea\_\-data\_\-plane\_\-manager}
\end{DoxyParamCaption}
)}}
\label{classFibConfigForwardingSolaris_ad20e3c546f354b082f79688bc5121721}


Constructor. 


\begin{DoxyParams}{Parameters}
{\em fea\_\-data\_\-plane\_\-manager} & \hyperlink{protocolthe-p}{the} corresponding data plane manager (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager}). \\
\hline
\end{DoxyParams}


\subsection{Member Function Documentation}
\hypertarget{classFibConfigForwardingSolaris_a1443aad6a880e77d2df38b87b48b6f41}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!accept\_\-rtadv\_\-enabled6@{accept\_\-rtadv\_\-enabled6}}
\index{accept\_\-rtadv\_\-enabled6@{accept\_\-rtadv\_\-enabled6}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{accept\_\-rtadv\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSolaris::accept\_\-rtadv\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool \&}]{ret\_\-value, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSolaris_a1443aad6a880e77d2df38b87b48b6f41}


Test whether \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages is enabled or disabled. 


\begin{DoxyParams}{Parameters}
{\em ret\_\-value} & if true on return, then \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages is enabled, otherwise is disabled. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a32455f2ccfbd390774634652f1912d8a}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSolaris_af501746336ec4eaf452a8c6d83c8f852}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!set\_\-accept\_\-rtadv\_\-enabled6@{set\_\-accept\_\-rtadv\_\-enabled6}}
\index{set\_\-accept\_\-rtadv\_\-enabled6@{set\_\-accept\_\-rtadv\_\-enabled6}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{set\_\-accept\_\-rtadv\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSolaris::set\_\-accept\_\-rtadv\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool}]{v, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSolaris_af501746336ec4eaf452a8c6d83c8f852}


Enable or disable \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages from other routers. 

It should be enabled for hosts, and disabled for routers.


\begin{DoxyParams}{Parameters}
{\em v} & if true, then enable \hyperlink{protocolthe-p}{the} acceptance of \hyperlink{classIPv6}{IPv6} Router Advertisement messages, otherwise disable it. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_ab102d1fb425892602103301f2c73af89}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSolaris_a1ac28f83f798fb2721bc2ef2b716c0d5}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!set\_\-unicast\_\-forwarding\_\-enabled4@{set\_\-unicast\_\-forwarding\_\-enabled4}}
\index{set\_\-unicast\_\-forwarding\_\-enabled4@{set\_\-unicast\_\-forwarding\_\-enabled4}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{set\_\-unicast\_\-forwarding\_\-enabled4}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSolaris::set\_\-unicast\_\-forwarding\_\-enabled4 (
\begin{DoxyParamCaption}
\item[{bool}]{v, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSolaris_a1ac28f83f798fb2721bc2ef2b716c0d5}


Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine to enable or disable forwarding of packets. 


\begin{DoxyParams}{Parameters}
{\em v} & if true, then enable \hyperlink{classIPv4}{IPv4} unicast forwarding, otherwise disable it. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a981daf728abe383181bb13cbc44caa9d}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSolaris_a0d062c1998b21820dd98696980ad2918}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!set\_\-unicast\_\-forwarding\_\-enabled6@{set\_\-unicast\_\-forwarding\_\-enabled6}}
\index{set\_\-unicast\_\-forwarding\_\-enabled6@{set\_\-unicast\_\-forwarding\_\-enabled6}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{set\_\-unicast\_\-forwarding\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSolaris::set\_\-unicast\_\-forwarding\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool}]{v, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSolaris_a0d062c1998b21820dd98696980ad2918}


Set \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine to enable or disable forwarding of packets. 


\begin{DoxyParams}{Parameters}
{\em v} & if true, then enable \hyperlink{classIPv6}{IPv6} unicast forwarding, otherwise disable it. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a2f30de6b81329ceb56a06bb9ab21f4b7}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSolaris_a027a1a0797a1ebcbee4f44ae227a2f60}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!unicast\_\-forwarding\_\-enabled4@{unicast\_\-forwarding\_\-enabled4}}
\index{unicast\_\-forwarding\_\-enabled4@{unicast\_\-forwarding\_\-enabled4}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{unicast\_\-forwarding\_\-enabled4}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSolaris::unicast\_\-forwarding\_\-enabled4 (
\begin{DoxyParamCaption}
\item[{bool \&}]{ret\_\-value, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSolaris_a027a1a0797a1ebcbee4f44ae227a2f60}


Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding engine is enabled or disabled to forward packets. 


\begin{DoxyParams}{Parameters}
{\em ret\_\-value} & if true on return, then \hyperlink{protocolthe-p}{the} \hyperlink{classIPv4}{IPv4} unicast forwarding is enabled, otherwise is disabled. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a75444169a6dd97809cfcbca73fc81957}{FibConfigForwarding}.

\hypertarget{classFibConfigForwardingSolaris_aa72215b832bbb92aa413eda18353aeee}{
\index{FibConfigForwardingSolaris@{FibConfigForwardingSolaris}!unicast\_\-forwarding\_\-enabled6@{unicast\_\-forwarding\_\-enabled6}}
\index{unicast\_\-forwarding\_\-enabled6@{unicast\_\-forwarding\_\-enabled6}!FibConfigForwardingSolaris@{FibConfigForwardingSolaris}}
\subsubsection[{unicast\_\-forwarding\_\-enabled6}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigForwardingSolaris::unicast\_\-forwarding\_\-enabled6 (
\begin{DoxyParamCaption}
\item[{bool \&}]{ret\_\-value, }
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigForwardingSolaris_aa72215b832bbb92aa413eda18353aeee}


Test whether \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding engine is enabled or disabled to forward packets. 


\begin{DoxyParams}{Parameters}
{\em ret\_\-value} & if true on return, then \hyperlink{protocolthe-p}{the} \hyperlink{classIPv6}{IPv6} unicast forwarding is enabled, otherwise is disabled. \\
\hline
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigForwarding_a10143fca75849e816de4328e898176b1}{FibConfigForwarding}.



The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/fea/data\_\-plane/fibconfig/fibconfig\_\-forwarding\_\-solaris.hh\end{DoxyCompactItemize}
