\hypertarget{classFibConfigEntryObserverRtmV2}{
\section{FibConfigEntryObserverRtmV2 Class Reference}
\label{classFibConfigEntryObserverRtmV2}\index{FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}}
}
Inheritance diagram for FibConfigEntryObserverRtmV2:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classFibConfigEntryObserverRtmV2}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classFibConfigEntryObserverRtmV2_a684477399b34b2a653cc507e75a173a1}{FibConfigEntryObserverRtmV2} (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager} \&fea\_\-data\_\-plane\_\-manager)
\begin{DoxyCompactList}\small\item\em Constructor. \item\end{DoxyCompactList}\item 
\hypertarget{classFibConfigEntryObserverRtmV2_a9fed3ba4f0740bf6ec8603382976c701}{
virtual \hyperlink{classFibConfigEntryObserverRtmV2_a9fed3ba4f0740bf6ec8603382976c701}{$\sim$FibConfigEntryObserverRtmV2} ()}
\label{classFibConfigEntryObserverRtmV2_a9fed3ba4f0740bf6ec8603382976c701}

\begin{DoxyCompactList}\small\item\em Virtual destructor. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigEntryObserverRtmV2_a27464ffaa05f46f990d8a44f72085bc2}{start} (string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Start operation. \item\end{DoxyCompactList}\item 
virtual int \hyperlink{classFibConfigEntryObserverRtmV2_ae3084f1892eff0fc1c670634b0700fc6}{stop} (string \&error\_\-msg)
\begin{DoxyCompactList}\small\item\em Stop operation. \item\end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{classFibConfigEntryObserverRtmV2_a684477399b34b2a653cc507e75a173a1}{
\index{FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}!FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}}
\index{FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}!FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}}
\subsubsection[{FibConfigEntryObserverRtmV2}]{\setlength{\rightskip}{0pt plus 5cm}FibConfigEntryObserverRtmV2::FibConfigEntryObserverRtmV2 (
\begin{DoxyParamCaption}
\item[{{\bf FeaDataPlaneManager} \&}]{fea\_\-data\_\-plane\_\-manager}
\end{DoxyParamCaption}
)}}
\label{classFibConfigEntryObserverRtmV2_a684477399b34b2a653cc507e75a173a1}


Constructor. 


\begin{DoxyParams}{Parameters}
{\em fea\_\-data\_\-plane\_\-manager} & \hyperlink{protocolthe-p}{the} corresponding data plane manager (\hyperlink{classFeaDataPlaneManager}{FeaDataPlaneManager}). \\
\hline
\end{DoxyParams}


\subsection{Member Function Documentation}
\hypertarget{classFibConfigEntryObserverRtmV2_a27464ffaa05f46f990d8a44f72085bc2}{
\index{FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}!start@{start}}
\index{start@{start}!FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}}
\subsubsection[{start}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigEntryObserverRtmV2::start (
\begin{DoxyParamCaption}
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigEntryObserverRtmV2_a27464ffaa05f46f990d8a44f72085bc2}


Start operation. 


\begin{DoxyParams}{Parameters}
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigEntryObserver_ae1205f050a3bc669f497f8cedac77b7f}{FibConfigEntryObserver}.

\hypertarget{classFibConfigEntryObserverRtmV2_ae3084f1892eff0fc1c670634b0700fc6}{
\index{FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}!stop@{stop}}
\index{stop@{stop}!FibConfigEntryObserverRtmV2@{FibConfigEntryObserverRtmV2}}
\subsubsection[{stop}]{\setlength{\rightskip}{0pt plus 5cm}virtual int FibConfigEntryObserverRtmV2::stop (
\begin{DoxyParamCaption}
\item[{string \&}]{error\_\-msg}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}
\label{classFibConfigEntryObserverRtmV2_ae3084f1892eff0fc1c670634b0700fc6}


Stop operation. 


\begin{DoxyParams}{Parameters}
{\em error\_\-msg} & \hyperlink{protocolthe-p}{the} error message (if error). \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
XORP\_\-OK on success, otherwise XORP\_\-ERROR. 
\end{DoxyReturn}


Implements \hyperlink{classFibConfigEntryObserver_a29428feee24a22cab8fbbad9020d9b91}{FibConfigEntryObserver}.



The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/fea/data\_\-plane/fibconfig/fibconfig\_\-entry\_\-observer\_\-rtmv2.hh\end{DoxyCompactItemize}
