\hypertarget{classBadLinkCode}{
\section{BadLinkCode Class Reference}
\label{classBadLinkCode}\index{BadLinkCode@{BadLinkCode}}
}


The exception thrown when an operation on a link code fails.  




{\ttfamily \#include $<$exceptions.hh$>$}

Inheritance diagram for BadLinkCode:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=3.000000cm]{classBadLinkCode}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hypertarget{classBadLinkCode_a9ccee5d2ef339063a2e39020e0c0ccbb}{
{\bfseries BadLinkCode} (const char $\ast$file, size\_\-t line, const string \&init\_\-why=\char`\"{}\char`\"{})}
\label{classBadLinkCode_a9ccee5d2ef339063a2e39020e0c0ccbb}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
The exception thrown when an operation on a link code fails. Usually this means \hyperlink{protocolthe-p}{the} fields provided were invalid. 

The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/greearb/git/xorp.ct.github/xorp/contrib/olsr/exceptions.hh\end{DoxyCompactItemize}
